{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"KEY","type":"character","width":25},{"name":"EN_CA","type":"character","width":254},{"name":"FR_CA","type":"character","width":254},{"name":"DE_DE","type":"character","width":254}],"n_rows":4,"rows_kept":4,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
["0","Map Projection","Projection cartographique","Kartenprojektion"]
["1","Please select a projection from the dropdown box and click [Ok] to reproject the current map view.","Choisissez une projection dans la liste et cliquez sur OK pour l'appliquer &agrave; la carte","Bitte wählen Sie eine Kartenprojektion aus der Liste und drücken Sie auf OK, um die Karten umzuprojizieren."]
["2","Projection","Projection","Projektion"]
["3","ERROR: Your mapfile don't have any projection defined. Can't change projection.","ERREUR: Votre mapfile n'a pas de projection d\u0082finit. Impossible de changer la projection.","ERROR: Für Ihr mapfile ist keine Kartenprojektion definiert. Die Projektion kann nicht geändert werden."]